 Code    - Set Morse code parameters
 Chars   - Select character set
 Ports   - Set RS-232 port parameters
 Colors  - Set screen colors
 Misc    - Set misc. hdw. and other parameters
 Zoom    - Set/reset zoom send mode
 Initial - Reset parameters to original status
 Save    - Save current parameters to disk
